Title: 1.6 The best temperature for steeping tea is

Q: 6. The best temperature for steeping tea is
- 99 ^o Celcius (correct) (The options are inconsistent because they utilise two different temperature scales, for example, 99 ^oC and 210 ^oF are the same temperature but are expressed in different scales. It would be hard to know which is the correct answer here. In addition, both 'Celcius' and 'Centigrade' are used, which assume that the test candidate knows that they represent the same temperatures and are interchangeable.)
- 210 ^o Farenheit (The options are inconsistent because they utilise two different temperature scales, for example, 99 ^oC and 210 ^oF are the same temperature but are expressed in different scales. It would be hard to know which is the correct answer here. In addition, both 'Celcius' and 'Centigrade' are used, which assume that the test candidate knows that they represent the same temperatures and are interchangeable.)
- 194 ^o Centigrade (The options are inconsistent because they utilise two different temperature scales, for example, 99 ^oC and 210 ^oF are the same temperature but are expressed in different scales. It would be hard to know which is the correct answer here. In addition, both 'Celcius' and 'Centigrade' are used, which assume that the test candidate knows that they represent the same temperatures and are interchangeable.)
- 99 ^o Farenheit (The options are inconsistent because they utilise two different temperature scales, for example, 99 ^oC and 210 ^oF are the same temperature but are expressed in different scales. It would be hard to know which is the correct answer here. In addition, both 'Celcius' and 'Centigrade' are used, which assume that the test candidate knows that they represent the same temperatures and are interchangeable.)